<template>
  <div class="energy-profile">
    <peak-secondary-title :title="title">
      <template>
        <div class="right-tab">
          <div class="tab-type" v-for="item of tabDataList" :class="activeDateTab === item.value? 'active-tab':''"
               @click="tabDateChange(item.value)">
            {{ item.name }}
          </div>
        </div>
      </template>
    </peak-secondary-title>
    <div class="_tab">
      <div class="tab-item" v-for="item of tabList" :class="item.value === activeTab?'active-tab':''"
           @click="tabChange(item.value)">{{ item.label }}
      </div>
    </div>
    <div class="energy-content">
      <div class="peak-energy-use" v-if="activeTab === 1">
        <peak-energy-use/>
      </div>
      <div class="peak-enterprise-operations">
        <peak-enterprise-operations v-if="activeTab === 2"/>
      </div>
    </div>
  </div>
</template>

<script>
import PeakSecondaryTitle from "@/components/peak-coal-monitoring/PeakSecondaryTitle";
import PeakEnergyUse from "@/components/peak-coal-monitoring/PeakEnergyUse";
import PeakEnterpriseOperations from "@/components/peak-coal-monitoring/PeakEnterpriseOperations";

export default {
  name: "EnergyProfile",
  components: {PeakEnterpriseOperations, PeakEnergyUse, PeakSecondaryTitle},
  data() {
    return {
      title: '能源概况',
      tabList: [
        {
          label: '能源使用情况',
          value: 1
        },
        {
          label: '企业运营情况',
          value: 2
        }
      ],
      tabDataList: [
        {
          name: '今日',
          value: '0'
        },
        {
          name: '本月',
          value: '1'
        },
        {
          name: '上月',
          value: '2'
        }
      ],
      activeDateTab:'0',
      activeTab: 1
    }
  },
  methods: {
    tabChange(val) {
      this.activeTab = val
    },
    tabDateChange(val) {
      this.activeDateTab = val
    },
  }
}
</script>

<style scoped lang="less">
@import "assets/styles/mixin";

.energy-profile {
  height: 100%;
  width: 100%;
  .flex-column;

  ._tab {
    margin-top: 10px;
    width: 100%;
    height: 30px;
    .flex-row;

    .tab-item {
      width: 50%;
      height: 100%;
      font-family: MicrosoftYaHei-Bold;
      font-size: 14px;
      color: #FFFFFF;
      letter-spacing: 0;
      text-align: center;
      text-shadow: 0 2px 2px rgba(0, 0, 0, 0.50);
      font-weight: 700;
      cursor: pointer;
    }

    .active-tab {
      background: url("~/assets/peakCoalMonitoring/common/tab-active-bg.png") no-repeat;
      background-size: 100% 100%;
    }
  }

  .energy-content {
    flex: 1;
    height: 0;
    .peak-energy-use{
      height: 100%;
    }

    .peak-enterprise-operations{
      height: 100%;
    }
  }

  .right-tab {
    height: 100%;
    .flex-row;
    justify-content: space-between;
    width: 220px;

    .tab-type {
      margin-bottom: 15px;
      width: 67px;
      height: 30px;
      .bg("~/assets/peakCoalImages/left/pollutant-type-default-bg.png");
      font-family: MicrosoftYaHei;
      font-size: 14px;
      color: rgba(216, 240, 255, 0.50);
      letter-spacing: 0;
      text-align: center;
      line-height: 30px;
      text-shadow: 0 0 11px #0091FF;
      font-weight: 400;
      cursor: pointer;
    }

    .active-tab {
      .bg("~/assets/peakCoalImages/left/pollutant-type-active-bg.png");
      color: #D8F0FF;
      text-shadow: 0 0 33px #0091FF;
      font-weight: 400;
    }
  }
}
</style>
