<!--能源使用情况-->
<template>
  <div class="energy-use">
    <div class="electricity-water-usage">
      <div class="electricity-usage">
        <div class="electricity-icon"></div>
        <div class="electricity-info">
          <div class="_title">今日用电[kwh]</div>
          <div class="_value">
            <Number :num="1244"/>
          </div>
        </div>
      </div>
      <div class="water-usage">
        <div class="water-icon"></div>
        <div class="water-info">
          <div class="_title">今日用水[m³]</div>
          <div class="_value">
            <Number :num="185"/>
          </div>
        </div>
      </div>
    </div>
    <peak-third-level-label :title="thirdLevelLabel"/>
    <div class="electricity-water-trends">
      <peak-energy-use-chart :data-source="electricityWaterDataSource"/>
    </div>
  </div>
</template>

<script>

import ElectricityWaterCharts from "@/components/charts/ElectricityWaterCharts";
import PeakThirdLevelLabel from "@/components/peak-coal-monitoring/PeakThirdLevelLabel";
import PeakEnergyUseChart from "@/components/charts/PeakEnergyUseChart";

export default {
  name: "PeakEnergyUse",
  components: {PeakEnergyUseChart, PeakThirdLevelLabel, ElectricityWaterCharts},
  data() {
    return {
      title: '能源使用情况',
      thirdLevelLabel: '水电使用情况',
      electricityWaterDataSource: [
        {
          name: '00:00',
          value1: '10',
          value2: '30',
          value3: '20'
        },
        {
          name: '01:00',
          value1: '30',
          value2: '20',
          value3: '10'
        },
        {
          name: '02:00',
          value1: '20',
          value2: '10',
          value3: '20'
        },
        {
          name: '03:00',
          value1: '20',
          value2: '30',
          value3: '60'
        },
        {
          name: '04:00',
          value1: '30',
          value2: '40',
          value3: '50'
        },
        {
          name: '05:00',
          value1: '10',
          value2: '20',
          value3: '30'
        },
        {
          name: '06:00',
          value1: '16',
          value2: '17',
          value3: '18'
        },
        {
          name: '07:00',
          value1: '30',
          value2: '20',
          value3: '10'
        }
      ],
      electricityWaterTab: 0
    }
  },
  methods: {
  }
}
</script>

<style scoped lang="less">
@import "assets/styles/mixin";

.energy-use {
  height: 100%;
  width: 100%;
  .flex-column;


  .electricity-water-usage {
    height: 80px;
    .flex-row;
    justify-content: space-between;

    .electricity-usage {
      .flex-row;

      .electricity-icon {
        width: 49px;
        height: 49px;
        .bg("~/assets/peakCoalMonitoring/right/electricity-icon.png");
      }

      .electricity-info {
        padding-left: 20px;
      }
    }

    .water-usage {
      .flex-row;

      .water-icon {
        width: 49px;
        height: 49px;
        .bg("~/assets/peakCoalMonitoring/right/water-icon.png");
      }

      .water-info {
        padding-left: 20px;
      }
    }

    ._title {
      font-family: MicrosoftYaHei;
      font-size: 14px;
      color: #6AC4FF;
      letter-spacing: 2.26px;
      font-weight: 400;
    }

    ._value {
      font-family: YouSheBiaoTiHei;
      font-size: 20px;
      color: #FFFFFF;
      letter-spacing: 5.64px;
      font-weight: 400;
    }
  }

  .electricity-water-trends {
    flex: 1;
    height: 0;
  }

}
</style>
