<template>
  <div class="energy-profile">
    <peak-secondary-title :title="title"></peak-secondary-title>
    <div class="_tab">
      <div class="tab-item" v-for="item of tabList" :class="item.value === activeTab?'active-tab':''"
           @click="tabChange(item.value)">{{ item.label }}
      </div>
    </div>
    <div class="energy-content">
      <div class="peak-energy-use" v-if="activeTab === 1">
        <peak-warning-type-chart :data-source="warningTypeDataSource"/>
      </div>
      <div class="peak-enterprise-operations" v-if="activeTab === 2">
        <peak-warning-type-chart :data-source="warningTypeDataSource"/>
      </div>
    </div>
  </div>
</template>

<script>
import PeakSecondaryTitle from "@/components/peak-coal-monitoring/PeakSecondaryTitle";
import PeakWarningTypeChart from "@/components/charts/PeakWarningTypeChart";

export default {
  name: "EnergyProfile",
  components: {PeakSecondaryTitle, PeakWarningTypeChart},
  data() {
    return {
      title: '清洁运输情况',
      tabList: [
        {
          label: '昨日清洁运输比例',
          value: 1
        },
        {
          label: '上周清洁运输比例',
          value: 2
        }
      ],
      activeDateTab: '0',
      activeTab: 1,
      warningTypeDataSource: [
        {
          name: '水运',
          value: 214,
          rate: '38%'
        },
        {
          name: '铁路',
          value: 342,
          rate: '32%'
        },
        {
          name: '管道',
          value: 12,
          rate: '30%'
        },
        {
          name: '国六',
          value: 12,
          rate: '30%'
        },
        {
          name: '新能源',
          value: 12,
          rate: '30%'
        }
      ]
    }
  },
  methods: {
    tabChange(val) {
      this.activeTab = val
    }
  }
}
</script>

<style scoped lang="less">
@import "assets/styles/mixin";

.energy-profile {
  height: 100%;
  width: 100%;
  .flex-column;

  ._tab {
    margin-top: 10px;
    width: 100%;
    height: 30px;
    .flex-row;

    .tab-item {
      width: 50%;
      height: 100%;
      font-family: MicrosoftYaHei-Bold;
      font-size: 14px;
      color: #FFFFFF;
      letter-spacing: 0;
      text-align: center;
      text-shadow: 0 2px 2px rgba(0, 0, 0, 0.50);
      font-weight: 700;
      cursor: pointer;
    }

    .active-tab {
      background: url("~/assets/peakCoalMonitoring/common/tab-active-bg.png") no-repeat;
      background-size: 100% 100%;
    }
  }

  .energy-content {
    flex: 1;
    height: 0;

    .peak-energy-use {
      height: 100%;
    }

    .peak-enterprise-operations {
      height: 100%;
    }


    ._bg {
      position: absolute;
      left: 26px;
      top: 24px;
      width: 120px;
      height: 120px;
      background: url("~/assets/peakCoalImages/right/warning-type-pie-bg.png") no-repeat;
      background-size: 100% 100%;
    }
  }

  .right-tab {
    height: 100%;
    .flex-row;
    justify-content: space-between;
    width: 220px;

    .tab-type {
      margin-bottom: 15px;
      width: 67px;
      height: 30px;
      .bg("~/assets/peakCoalImages/left/pollutant-type-default-bg.png");
      font-family: MicrosoftYaHei;
      font-size: 14px;
      color: rgba(216, 240, 255, 0.50);
      letter-spacing: 0;
      text-align: center;
      line-height: 30px;
      text-shadow: 0 0 11px #0091FF;
      font-weight: 400;
      cursor: pointer;
    }

    .active-tab {
      .bg("~/assets/peakCoalImages/left/pollutant-type-active-bg.png");
      color: #D8F0FF;
      text-shadow: 0 0 33px #0091FF;
      font-weight: 400;
    }
  }
}
</style>
