<template>
  <div class="atmospheric-module">
    <peak-secondary-title :title="title"/>
    <div class="charts-info">
      <peak-air-quality/>
    </div>
  </div>
</template>

<script>
import PeakSecondaryTitle from "@/components/peak-coal-monitoring/PeakSecondaryTitle";
import PeakAirQuality from "@/components/peak-coal-monitoring/PeakAirQuality";

export default {
  name: "DeviceOnlineRate",
  components: {PeakAirQuality, PeakSecondaryTitle},
  data() {
    return {
      title: '治理设备在线率'
    }
  },
  methods: {}
}
</script>

<style scoped lang="less">
@import "../../assets/styles/mixin";

.atmospheric-module {
  height: 100%;
  width: 100%;
  .flex-column;

  .charts-info {
    flex: 1;
    height: 0;
  }
}
</style>
