<!--设备运行情况-->
<template>
  <div class="device-run">
    <secondary-title :title="title" longBg></secondary-title>
  </div>
</template>

<script>
export default {
  name: "DeviceRun",
  data() {
    return {
      title: '设备运行情况'
    }
  }
}
</script>

<style scoped lang="less">
@import "assets/styles/mixin";

.device-run {
  margin-top: 43px;
  height: 416px;
  width: 100%;
  background-image: linear-gradient(62deg, rgba(8, 31, 55, 0.10) 0%, rgba(18, 50, 81, 0.10) 100%);
  border: 1px solid transparent; /* 先将边框颜色设置为透明 */
  border-image: linear-gradient(rgba(79, 182, 238, 0), rgba(39, 127, 216, 1)); /* 使用线性渐变作为边框图片 */
  border-image-slice: 1; /* 指定切分边框图像的位置 */
}
</style>
